From 05b1c8101fdb253b4e58ee7cff218dd3713a63a4 Mon Sep 17 00:00:00 2001
From: Jacob Richman <jacob314@gmail.com>
Date: Fri, 20 Jun 2025 05:27:03 +0000
Subject: Turn off debug logging of MaxSizedBox errors by default. (#1228)

---
 packages/cli/src/ui/components/shared/MaxSizedBox.tsx | 6 +++++-
 1 file changed, 5 insertions(+), 1 deletion(-)

(limited to 'packages/cli/src/ui/components/shared/MaxSizedBox.tsx')

diff --git a/packages/cli/src/ui/components/shared/MaxSizedBox.tsx b/packages/cli/src/ui/components/shared/MaxSizedBox.tsx
index fe73c250..1b5b90aa 100644
--- a/packages/cli/src/ui/components/shared/MaxSizedBox.tsx
+++ b/packages/cli/src/ui/components/shared/MaxSizedBox.tsx
@@ -10,7 +10,11 @@ import stringWidth from 'string-width';
 import { Colors } from '../../colors.js';
 import { toCodePoints } from '../../utils/textUtils.js';
 
-const enableDebugLog = true;
+let enableDebugLog = false;
+
+export function setMaxSizedBoxDebugging(value: boolean) {
+  enableDebugLog = value;
+}
 
 function debugReportError(message: string, element: React.ReactNode) {
   if (!enableDebugLog) return;
-- 
cgit v1.2.3

