From ab96676e360b57cb5467826793288d4d6e003d60 Mon Sep 17 00:00:00 2001
From: Didier Durand <durand.didier@gmail.com>
Date: Sat, 5 Jul 2025 17:23:39 +0200
Subject: fix typos in diverse files (#3284)

Co-authored-by: Scott Densmore <scottdensmore@mac.com>
---
 packages/cli/src/ui/components/shared/MaxSizedBox.test.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/cli/src/ui/components/shared/MaxSizedBox.test.tsx')

diff --git a/packages/cli/src/ui/components/shared/MaxSizedBox.test.tsx b/packages/cli/src/ui/components/shared/MaxSizedBox.test.tsx
index c392159b..50951b4f 100644
--- a/packages/cli/src/ui/components/shared/MaxSizedBox.test.tsx
+++ b/packages/cli/src/ui/components/shared/MaxSizedBox.test.tsx
@@ -13,7 +13,7 @@ import { describe, it, expect } from 'vitest';
 describe('<MaxSizedBox />', () => {
   // Make sure MaxSizedBox logs errors on invalid configurations.
   // This is useful for debugging issues with the component.
-  // It should be set to false in production for perfornance and to avoid
+  // It should be set to false in production for performance and to avoid
   // cluttering the console if there are ignorable issues.
   setMaxSizedBoxDebugging(true);
 
-- 
cgit v1.2.3

