From 81ba61df7f967f141cd8abc57d58a3612dfd4c2b Mon Sep 17 00:00:00 2001
From: Jaana Dogan <jbd@google.com>
Date: Thu, 17 Apr 2025 12:03:02 -0700
Subject: Improve readability issues

This is only the first change of many changes.

* Remove redundant autogenerated comments
* Use the recommended file name style
* Use camelCase for variable names
* Don't introduce submodules for relevant types
* Don't introduce constants like modules, these are implementation details
* Remove empty files
---
 packages/cli/src/ui/components/messages/ToolMessage.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/cli/src/ui/components/messages/ToolMessage.tsx')

diff --git a/packages/cli/src/ui/components/messages/ToolMessage.tsx b/packages/cli/src/ui/components/messages/ToolMessage.tsx
index 38bc3de1..4ad947c9 100644
--- a/packages/cli/src/ui/components/messages/ToolMessage.tsx
+++ b/packages/cli/src/ui/components/messages/ToolMessage.tsx
@@ -2,7 +2,7 @@ import React from 'react';
 import { Box, Text } from 'ink';
 import Spinner from 'ink-spinner';
 import { ToolCallStatus } from '../../types.js';
-import { ToolResultDisplay } from '../../../tools/ToolResult.js';
+import { ToolResultDisplay } from '../../../tools/tool.js';
 import DiffRenderer from './DiffRenderer.js';
 import { MarkdownRenderer } from '../../utils/MarkdownRenderer.js';
 
-- 
cgit v1.2.3

