From 7408c78dbb0e3f96602ec06b5eb9e3a43470fb4e Mon Sep 17 00:00:00 2001
From: Taylor Mullen <ntaylormullen@google.com>
Date: Sun, 25 May 2025 15:14:48 -0700
Subject: Change tool call spinner to be different.

- This differentiates the tool calling spinner from one that matches the normal loading indiator to somethign a little more seamless.
---
 packages/cli/src/ui/components/messages/ToolMessage.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/cli/src/ui/components/messages/ToolMessage.tsx')

diff --git a/packages/cli/src/ui/components/messages/ToolMessage.tsx b/packages/cli/src/ui/components/messages/ToolMessage.tsx
index 775b4177..c8b61297 100644
--- a/packages/cli/src/ui/components/messages/ToolMessage.tsx
+++ b/packages/cli/src/ui/components/messages/ToolMessage.tsx
@@ -118,7 +118,7 @@ const ToolStatusIndicator: React.FC<ToolStatusIndicatorProps> = ({
       )}
       {status === ToolCallStatus.Executing &&
         (streamingState === StreamingState.Responding ? (
-          <Spinner type="dots" />
+          <Spinner type="toggle" />
         ) : (
           // Paused spinner to avoid flicker.
           <Text>⠇</Text>
-- 
cgit v1.2.3

