From 5be89befeff9c4d4f3ab9f508f030bc153fdd06b Mon Sep 17 00:00:00 2001
From: Taylor Mullen <ntaylormullen@google.com>
Date: Fri, 25 Apr 2025 17:11:08 -0700
Subject: feat: Fix flickering in iTerm + scrolling + performance issues.

- Refactors history display using Ink's <Static> component to prevent flickering and improve performance by rendering completed items statically.
- Introduces ConsolePatcher component to capture and display console.log, console.warn, and console.error output within the Ink UI, addressing native handling issues.
- Introduce a new content splitting mechanism to work better for static items. Basically when content gets too long we will now split content into multiple blocks for Gemini messages to ensure that we can statically cache larger pieces of history.

Fixes:
- https://b.corp.google.com/issues/411450097
- https://b.corp.google.com/issues/412716309
---
 packages/cli/src/ui/components/messages/ToolMessage.tsx | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'packages/cli/src/ui/components/messages/ToolMessage.tsx')

diff --git a/packages/cli/src/ui/components/messages/ToolMessage.tsx b/packages/cli/src/ui/components/messages/ToolMessage.tsx
index ab590f53..4d5fca37 100644
--- a/packages/cli/src/ui/components/messages/ToolMessage.tsx
+++ b/packages/cli/src/ui/components/messages/ToolMessage.tsx
@@ -54,8 +54,8 @@ export const ToolMessage: React.FC<IndividualToolCallDisplay> = ({
         </Box>
       </Box>
       {hasResult && (
-        <Box paddingLeft={statusIndicatorWidth}>
-          <Box flexShrink={1} flexDirection="row">
+        <Box paddingLeft={statusIndicatorWidth} width="100%">
+          <Box flexDirection="row">
             {/* Use default text color (white) or gray instead of dimColor */}
             {typeof resultDisplay === 'string' && (
               <Box flexDirection="column">
-- 
cgit v1.2.3

