From a0ba65944fd1f940c161e7bb2aa7f01f62ae1c15 Mon Sep 17 00:00:00 2001
From: Olcan <olcans@gmail.com>
Date: Fri, 30 May 2025 12:43:59 -0700
Subject: disable markdown rendering of shell tool output (#625)

---
 packages/cli/src/ui/components/messages/ToolGroupMessage.tsx | 1 +
 1 file changed, 1 insertion(+)

(limited to 'packages/cli/src/ui/components/messages/ToolGroupMessage.tsx')

diff --git a/packages/cli/src/ui/components/messages/ToolGroupMessage.tsx b/packages/cli/src/ui/components/messages/ToolGroupMessage.tsx
index 8bcde3bb..280b4321 100644
--- a/packages/cli/src/ui/components/messages/ToolGroupMessage.tsx
+++ b/packages/cli/src/ui/components/messages/ToolGroupMessage.tsx
@@ -72,6 +72,7 @@ export const ToolGroupMessage: React.FC<ToolGroupMessageProps> = ({
                       ? 'low'
                       : 'medium'
                 }
+                renderOutputAsMarkdown={tool.renderOutputAsMarkdown}
               />
             </Box>
             {tool.status === ToolCallStatus.Confirming &&
-- 
cgit v1.2.3

