From b0bc7c3d996d25c9fefdfbcba3ca19fa46ad199f Mon Sep 17 00:00:00 2001
From: Jacob Richman <jacob314@gmail.com>
Date: Thu, 19 Jun 2025 20:17:23 +0000
Subject: Fix flicker issues by ensuring all actively changing content fits in
 the viewport (#1217)

---
 packages/cli/src/ui/components/HistoryItemDisplay.test.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/cli/src/ui/components/HistoryItemDisplay.test.tsx')

diff --git a/packages/cli/src/ui/components/HistoryItemDisplay.test.tsx b/packages/cli/src/ui/components/HistoryItemDisplay.test.tsx
index 5999f0ad..464647b0 100644
--- a/packages/cli/src/ui/components/HistoryItemDisplay.test.tsx
+++ b/packages/cli/src/ui/components/HistoryItemDisplay.test.tsx
@@ -20,7 +20,7 @@ describe('<HistoryItemDisplay />', () => {
     id: 1,
     timestamp: 12345,
     isPending: false,
-    availableTerminalHeight: 100,
+    terminalWidth: 80,
   };
 
   it('renders UserMessage for "user" type', () => {
-- 
cgit v1.2.3

