From da50a1eefbd0751aaf137882595d500e6b6b4179 Mon Sep 17 00:00:00 2001
From: christine betts <chrstn@uw.edu>
Date: Wed, 9 Jul 2025 21:16:42 +0000
Subject: Add system-wide settings config for administrators (#3498)

Co-authored-by: Jack Wotherspoon <jackwoth@google.com>
---
 packages/cli/src/ui/components/AuthDialog.test.tsx | 14 ++++++++++++++
 1 file changed, 14 insertions(+)

(limited to 'packages/cli/src/ui/components/AuthDialog.test.tsx')

diff --git a/packages/cli/src/ui/components/AuthDialog.test.tsx b/packages/cli/src/ui/components/AuthDialog.test.tsx
index 60a8a930..d9f1bd2c 100644
--- a/packages/cli/src/ui/components/AuthDialog.test.tsx
+++ b/packages/cli/src/ui/components/AuthDialog.test.tsx
@@ -29,6 +29,10 @@ describe('AuthDialog', () => {
     process.env.GEMINI_API_KEY = '';
 
     const settings: LoadedSettings = new LoadedSettings(
+      {
+        settings: {},
+        path: '',
+      },
       {
         settings: {
           selectedAuthType: AuthType.USE_GEMINI,
@@ -86,6 +90,12 @@ describe('AuthDialog', () => {
         settings: {},
         path: '',
       },
+      {
+        settings: {
+          selectedAuthType: undefined,
+        },
+        path: '',
+      },
       {
         settings: {},
         path: '',
@@ -147,6 +157,10 @@ describe('AuthDialog', () => {
   it('should allow exiting when auth method is already selected', async () => {
     const onSelect = vi.fn();
     const settings: LoadedSettings = new LoadedSettings(
+      {
+        settings: {},
+        path: '',
+      },
       {
         settings: {
           selectedAuthType: AuthType.USE_GEMINI,
-- 
cgit v1.2.3

