From b089845f1c34e5475bcae9cc8eb42fba8be9adc4 Mon Sep 17 00:00:00 2001
From: Jacob Richman <jacob314@gmail.com>
Date: Fri, 25 Jul 2025 17:36:19 -0700
Subject: fix(ui): remove extraneous whitespace from startup screen (#3990)

---
 packages/cli/src/ui/App.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/cli/src/ui/App.tsx')

diff --git a/packages/cli/src/ui/App.tsx b/packages/cli/src/ui/App.tsx
index 6163ac51..7b5aa8d0 100644
--- a/packages/cli/src/ui/App.tsx
+++ b/packages/cli/src/ui/App.tsx
@@ -748,7 +748,7 @@ const App = ({ config, settings, startupWarnings = [], version }: AppProps) => {
 
   return (
     <StreamingContext.Provider value={streamingState}>
-      <Box flexDirection="column" marginBottom={1} width="90%">
+      <Box flexDirection="column" width="90%">
         {/* Move UpdateNotification outside Static so it can re-render when updateMessage changes */}
         {updateMessage && <UpdateNotification message={updateMessage} />}
 
-- 
cgit v1.2.3

